\HeaderA{cav}{Position of Muscle Caveolae}{cav}
\keyword{datasets}{cav}
\begin{Description}\relax
The \code{cav} data frame has 138 rows and 2 columns.


The data gives the positions of the individual caveolae in a square region
with sides of length 500 units.  This grid was originally on a 2.65mum
square of muscle fibre.  The data are those points falling in the lower left 
hand quarter of the region used for the
dataset \code{caveolae.dat} in the \pkg{spatial} package by B.D. Ripley (1994) which is part of the recommended \pkg{VR} bundle.
\end{Description}
\begin{Usage}
\begin{verbatim}
cav
\end{verbatim}
\end{Usage}
\begin{Format}\relax
This data frame contains the following columns:


\describe{
\item[\code{x}] The x coordinate of the caveola's position in the region.

\item[\code{y}] The y coordinate of the caveola's position in the region.
}
\end{Format}
\begin{References}\relax
Appleyard, S.T., Witkowski, J.A., Ripley, B.D., Shotton, D.M. and Dubowicz, V.
(1985) A novel procedure for pattern analysis of features present on freeze 
fractured plasma membranes. \emph{Journal of Cell Science}, \bold{74}, 105--117.


Davison, A.C. and Hinkley, D.V. (1997) \emph{Bootstrap Methods and Their Application}. Cambridge University Press.
\end{References}

