\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{26}{|r}|}
\hline
Assembly & \# contigs ($\geq$ 0 bp) & \# contigs ($\geq$ 1000 bp) & \# contigs ($\geq$ 5000 bp) & \# contigs ($\geq$ 10000 bp) & \# contigs ($\geq$ 25000 bp) & \# contigs ($\geq$ 50000 bp) & Total length ($\geq$ 0 bp) & Total length ($\geq$ 1000 bp) & Total length ($\geq$ 5000 bp) & Total length ($\geq$ 10000 bp) & Total length ($\geq$ 25000 bp) & Total length ($\geq$ 50000 bp) & \# contigs & Largest contig & Total length & Reference length & GC (\%) & Reference GC (\%) & N50 & NG50 & N75 & L50 & LG50 & L75 & \# N's per 100 kbp & NGA50 \\ \hline
contigs\_1 & 3 & 3 & 0 & 0 & 0 & 0 & 6710 & 6710 & 0 & 0 & 0 & 0 & 3 & 3980 & 6710 & 10000 & 51.28 & 52.07 & 3980 & 1610 & 1610 & 1 & 2 & 2 & 0.00 & - \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
