\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{2}{|r}|}
\hline
Assembly & SOAPdenovo2.scafSeq & SOAPdenovo2.scafSeq\_broken \\ \hline
\# contigs ($\geq$ 0 bp) & 500300 & - \\ \hline
\# contigs ($\geq$ 1000 bp) & 55809 & 46851 \\ \hline
\# contigs ($\geq$ 5000 bp) & 3647 & 2770 \\ \hline
\# contigs ($\geq$ 10000 bp) & 1076 & 805 \\ \hline
\# contigs ($\geq$ 25000 bp) & 216 & 92 \\ \hline
\# contigs ($\geq$ 50000 bp) & 56 & 11 \\ \hline
Total length ($\geq$ 0 bp) & {\bf 264648000} & - \\ \hline
Total length ($\geq$ 1000 bp) & {\bf 136479796} & 103549954 \\ \hline
Total length ($\geq$ 5000 bp) & {\bf 39282442} & 27158771 \\ \hline
Total length ($\geq$ 10000 bp) & {\bf 22040736} & 13844768 \\ \hline
Total length ($\geq$ 25000 bp) & {\bf 9324017} & 3386518 \\ \hline
Total length ($\geq$ 50000 bp) & {\bf 3916015} & 745412 \\ \hline
\# contigs & 115414 & 125347 \\ \hline
Largest contig & {\bf 127553} & 110960 \\ \hline
Total length & {\bf 178519097} & 157944652 \\ \hline
GC (\%) & 54.96 & 55.14 \\ \hline
N50 & {\bf 1943} & 1404 \\ \hline
N75 & {\bf 1035} & 825 \\ \hline
L50 & {\bf 21223} & 25916 \\ \hline
L75 & {\bf 53263} & 63305 \\ \hline
\# N's per 100 kbp & 1439.01 & {\bf 67.38} \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
