\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{21}{|r}|}
\hline
Assembly & \# contigs ($\geq$ 0 bp) & \# contigs ($\geq$ 1000 bp) & \# contigs ($\geq$ 5000 bp) & \# contigs ($\geq$ 10000 bp) & \# contigs ($\geq$ 25000 bp) & \# contigs ($\geq$ 50000 bp) & Total length ($\geq$ 0 bp) & Total length ($\geq$ 1000 bp) & Total length ($\geq$ 5000 bp) & Total length ($\geq$ 10000 bp) & Total length ($\geq$ 25000 bp) & Total length ($\geq$ 50000 bp) & \# contigs & Largest contig & Total length & GC (\%) & N50 & N75 & L50 & L75 & \# N's per 100 kbp \\ \hline
SOAPdenovo2.scafSeq & 500300 & 55809 & 3647 & 1076 & 216 & 56 & 264648000 & 136479796 & 39282442 & 22040736 & 9324017 & 3916015 & 115414 & 127553 & 178519097 & 54.96 & 1943 & 1035 & 21223 & 53263 & 1439.01 \\ \hline
SOAPdenovo2.scafSeq\_broken & - & 46851 & 2770 & 805 & 92 & 11 & - & 103549954 & 27158771 & 13844768 & 3386518 & 745412 & 125347 & 110960 & 157944652 & 55.14 & 1404 & 825 & 25916 & 63305 & 67.38 \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
