\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{21}{|r}|}
\hline
Assembly & \# contigs ($\geq$ 0 bp) & \# contigs ($\geq$ 1000 bp) & \# contigs ($\geq$ 5000 bp) & \# contigs ($\geq$ 10000 bp) & \# contigs ($\geq$ 25000 bp) & \# contigs ($\geq$ 50000 bp) & Total length ($\geq$ 0 bp) & Total length ($\geq$ 1000 bp) & Total length ($\geq$ 5000 bp) & Total length ($\geq$ 10000 bp) & Total length ($\geq$ 25000 bp) & Total length ($\geq$ 50000 bp) & \# contigs & Largest contig & Total length & GC (\%) & N50 & N75 & L50 & L75 & \# N's per 100 kbp \\ \hline
SOAPdenovo2.scafSeq & 433217 & 27920 & 7383 & 2325 & 393 & 77 & 236222119 & 135643419 & 79485811 & 44279620 & 16258311 & 5712342 & 48626 & 187346 & 149570485 & 53.72 & 5406 & 3559 & 6479 & 14854 & 55040.28 \\ \hline
SOAPdenovo2.scafSeq\_broken & - & 11765 & 552 & 116 & 4 & 0 & - & 24311870 & 4566656 & 1626111 & 142783 & 0 & 47225 & 39531 & 47623442 & 54.59 & 1024 & 657 & 11271 & 26200 & 3.80 \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
