\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{21}{|r}|}
\hline
Assembly & \# contigs ($\geq$ 0 bp) & \# contigs ($\geq$ 1000 bp) & \# contigs ($\geq$ 5000 bp) & \# contigs ($\geq$ 10000 bp) & \# contigs ($\geq$ 25000 bp) & \# contigs ($\geq$ 50000 bp) & Total length ($\geq$ 0 bp) & Total length ($\geq$ 1000 bp) & Total length ($\geq$ 5000 bp) & Total length ($\geq$ 10000 bp) & Total length ($\geq$ 25000 bp) & Total length ($\geq$ 50000 bp) & \# contigs & Largest contig & Total length & GC (\%) & N50 & N75 & L50 & L75 & \# N's per 100 kbp \\ \hline
SOAPdenovo2.scafSeq & 460832 & 52963 & 15310 & 4029 & 348 & 65 & 341557143 & 238700704 & 142785220 & 65449439 & 13809407 & 4528785 & 81683 & 131125 & 258047143 & 54.98 & 5616 & 2807 & 12713 & 28913 & 31576.15 \\ \hline
SOAPdenovo2.scafSeq\_broken & - & 42521 & 2650 & 754 & 78 & 11 & - & 94617133 & 25694191 & 12909605 & 2960585 & 745412 & 122248 & 110960 & 149486868 & 55.25 & 1346 & 793 & 25253 & 62248 & 27.95 \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
