\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{21}{|r}|}
\hline
Assembly & \# contigs ($\geq$ 0 bp) & \# contigs ($\geq$ 1000 bp) & \# contigs ($\geq$ 5000 bp) & \# contigs ($\geq$ 10000 bp) & \# contigs ($\geq$ 25000 bp) & \# contigs ($\geq$ 50000 bp) & Total length ($\geq$ 0 bp) & Total length ($\geq$ 1000 bp) & Total length ($\geq$ 5000 bp) & Total length ($\geq$ 10000 bp) & Total length ($\geq$ 25000 bp) & Total length ($\geq$ 50000 bp) & \# contigs & Largest contig & Total length & GC (\%) & N50 & N75 & L50 & L75 & \# N's per 100 kbp \\ \hline
scaffolds & 36255 & 23838 & 2364 & 729 & 208 & 56 & 78609336 & 68721254 & 28150500 & 17117655 & 9584419 & 4281317 & 34778 & 170145 & 78370545 & 60.38 & 3023 & 1374 & 5253 & 15253 & 1.13 \\ \hline
scaffolds\_broken & - & 23851 & 2361 & 727 & 208 & 56 & - & 68718590 & 28124390 & 17093039 & 9584419 & 4281317 & 34793 & 170145 & 78369662 & 60.38 & 3021 & 1374 & 5258 & 15266 & 0.00 \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
