MBCRR 1

)

N

Mase ( Supplied Configuration Files )MISC. REFERENCE MANUAL PAGESMase ( Supplied Configuration Files

AME Standard supplied configuration files DESCRIPTION

MASEis distributed with several ‘‘Pre-made’’ configuration files. Most of these are configuration files = for OUTPUT-ALIGNED.Others have some key mappings. All might serve as useful tutorials. /colors.cp7.aa

For OUTPUT-ALIGNED.Will generate different colors for a set of amino acids, configured = for an NEC CP7 color printer.

/colors.cp7.patterns

For OUTPUT-ALIGNED. Will generate different colors for different pattern numbers, = configured for an NEC CP7 color printer.

/colors.la100.patterns

For OUTPUT-ALIGNED.Pattern printing for DEC-LA100 (has only bold/underlined or regular). a =/colors.nec.a

For OUTPUT-ALIGNED.To print amino acid classes in color on NEC APC III personal computer. a =/colors.nec.n

For OUTPUT-ALIGNED. To print nucleic acid classes in color on NEC APC III personal = computer.

/colors.nec.patterns

Pattern colors on NEC APC III =/colors.startstop

For OUTPUT-ALIGNED.Generate patterns for BOXERprogram. =/keys.dna

Some key mappings and bindings useful for editing nucleic acid sequnces. =/keys.dna.new

Some key mappings and bindings useful for editing nucleic acid sequnces. Does not map lower to upper case. n =/keys.protei

Some key mappings and bindings useful for editing nucleic acid sequnces. =/keys.protein.new

Some key mappings and bindings useful for editing nucleic acid sequnces. Does not map I lower to upper case n MASE home directory - Maserc . F EXAMPLES

System wide MASEinitialization file

ILES SEE ALSO

M

BUGS

BCRR Last change: DFCI 1