// Spread sheet definition for the ACeDB software 
// Date: 2004-04-08_14:08:29

// %n (%%n in the graphic)  are parameter to be given on the command line in tace
// or by default by the Parameters given in this file
// \%n (%n in the graphic) are substituted by the value of column n at run time
// Line starting with // are ignored, starting with # are comments

Parameters a3

Sortcolumn 1

Colonne 1 
Subtitle Column #1  
Width 12 
Optional 
Visible 
Class 
Class aql1 
Condition IS >= %1
 
Colonne 2 
Subtitle Column #3  
Width 12 
Optional 
Visible 
Integer 
From 1 
Tag ivalue  
 
Colonne 3 
Subtitle Column #4  
Width 12 
Optional 
Visible 
Float 
From 1 
Tag fvalue  
 
Colonne 4 
Subtitle Column #5  
Width 12 
Optional 
Visible 
Text 
From 1 
Tag tvalue  
 
Colonne 5 
Subtitle Column #6  
Width 12 
Optional 
Visible 
Date 
From 1 
Tag dvalue  
 
Colonne 6 
Subtitle Column #7  
Width 12 
Optional 
Visible 
Class 
Class arf 
From 1 
Tag ovalue  
 
 

// End of these definitions
