// $Id: allele2clone.def,v 1.1 1995/08/08 15:14:45 srk Exp $
// Spread sheet definition for the ACeDB software 
// User: mieg
// Date: 94-11-25_12:58:50

// %n (%%n in the graphic)  are parameter to be given on the command line in tace
// \%n (%n in the graphic) are substituted by the value of column n at run time
// Line starting with // are ignored, starting with # are comments

Colonne 1 
Width 12 
Mandatory 
Visible 
Class 
Class Allele 
From 0 
Tag "(null)"  
 
Colonne 2 
Width 12 
Optional 
Visible 
Class 
Class Locus 
From 1 
Tag Gene 
Condition "unc*" 
 
Colonne 3 
Width 12 
Mandatory 
Visible 
Class 
Class Map 
From 2 
Tag Map 
Condition IS III
 
Colonne 4 
Width 12 
Optional 
Visible 
Float 
Right_of 3 
Tag  HERE  # Position 
 
Colonne 5 
Width 12 
Optional 
Visible 
Class 
Class Clone 
From 2 
Tag Positive_clone 
 
Colonne 6 
Width 12 
Optional 
Visible 
Class 
Class Contig 
From 5 
Tag pMap 
 
Colonne 7 
Width 12 
Optional 
Visible 
Integer 
Right_of 6 
Tag  HERE  
 
 

// End of these definitions
