// Spread sheet definition for the ACeDB software 
// Date: 1999-02-09_14:35:39

// %n (%%n in the graphic)  are parameter to be given on the command line in tace
// or by default by the Parameters given in this file
// \%n (%n in the graphic) are substituted by the value of column n at run time
// Line starting with // are ignored, starting with # are comments

Title Up genes

Sortcolumn 1

Colonne 1 
Width 12 
Mandatory 
Hidden 
Class 
Class Locus 
From 1 
Tag "(null)"   
Condition IS unc*
 
Colonne 2 
Width 12 
Optional 
Visible 
Class 
Class 2_point_data 
From 1 
Tag 2_point  
 
Colonne 3 
Width 12 
Optional 
Visible 
Class 
Class Locus 
From 2 
Tag Locus_1  
 
Colonne 4 
Width 12 
Optional 
Visible 
Class 
Class Locus 
From 2 
Tag Locus_2  
 
Colonne 5 
Width 12 
Mandatory 
Visible 
Float 
From 2 
Tag Calc_distance  
 
 

// End of these definitions
