// $Id: up-assembly.def,v 1.2 1997/04/15 12:31:01 mieg Exp $
// Spread sheet definition for the ACeDB software 
// User: mieg
// Date: 94-11-25_13:34:54

// %n (%%n in the graphic)  are parameter to be given on the command line in tace
// \%n (%n in the graphic) are substituted by the value of column n at run time
// Line starting with // are ignored, starting with # are comments

Title Up genes
Parameters a*

Colonne 1 
Width 12 
Mandatory 
Visible 
Class 
Class Sequence 
From 0 
Condition %1 
 
Colonne 2 
Width 18 
Optional 
Visible 
Class 
Class Sequence 
From 1 
Tag Assembled_from  
 
Colonne 3 
Width 12 
Optional 
Visible 
Integer 
Right_of 2 
Tag HERE  
 
Colonne 4 
Width 12 
Mandatory 
Visible 
Integer 
Right_of 3 
Tag HERE  
Condition \%4 < \%3 
 
 

// End of these definitions
