\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{2}{|r}|}
\hline
Assembly & SOAPdenovo2.scafSeq & SOAPdenovo2.scafSeq\_broken \\ \hline
\# contigs ($\geq$ 0 bp) & 1330663 & - \\ \hline
\# contigs ($\geq$ 1000 bp) & 29470 & 2744 \\ \hline
\# contigs ($\geq$ 5000 bp) & 4687 & 0 \\ \hline
\# contigs ($\geq$ 10000 bp) & 470 & 0 \\ \hline
\# contigs ($\geq$ 25000 bp) & 1 & 0 \\ \hline
\# contigs ($\geq$ 50000 bp) & 0 & 0 \\ \hline
Total length ($\geq$ 0 bp) & {\bf 335763832} & - \\ \hline
Total length ($\geq$ 1000 bp) & {\bf 95944226} & 3400903 \\ \hline
Total length ($\geq$ 5000 bp) & {\bf 33444187} & 0 \\ \hline
Total length ($\geq$ 10000 bp) & {\bf 5831546} & 0 \\ \hline
Total length ($\geq$ 25000 bp) & {\bf 28486} & 0 \\ \hline
Total length ($\geq$ 50000 bp) & 0 & 0 \\ \hline
\# contigs & 65727 & 45567 \\ \hline
Largest contig & {\bf 28486} & 3952 \\ \hline
Total length & {\bf 120152578} & 30624260 \\ \hline
GC (\%) & 50.64 & 51.03 \\ \hline
N50 & {\bf 4207} & 648 \\ \hline
N75 & {\bf 1247} & 560 \\ \hline
L50 & {\bf 10606} & 18278 \\ \hline
L75 & {\bf 24232} & 31052 \\ \hline
\# N's per 100 kbp & 52466.67 & {\bf 0.83} \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
