\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{21}{|r}|}
\hline
Assembly & \# contigs ($\geq$ 0 bp) & \# contigs ($\geq$ 1000 bp) & \# contigs ($\geq$ 5000 bp) & \# contigs ($\geq$ 10000 bp) & \# contigs ($\geq$ 25000 bp) & \# contigs ($\geq$ 50000 bp) & Total length ($\geq$ 0 bp) & Total length ($\geq$ 1000 bp) & Total length ($\geq$ 5000 bp) & Total length ($\geq$ 10000 bp) & Total length ($\geq$ 25000 bp) & Total length ($\geq$ 50000 bp) & \# contigs & Largest contig & Total length & GC (\%) & N50 & N75 & L50 & L75 & \# N's per 100 kbp \\ \hline
SOAPdenovo2.scafSeq & 1330663 & 29470 & 4687 & 470 & 1 & 0 & 335763832 & 95944226 & 33444187 & 5831546 & 28486 & 0 & 65727 & 28486 & 120152578 & 50.64 & 4207 & 1247 & 10606 & 24232 & 52466.67 \\ \hline
SOAPdenovo2.scafSeq\_broken & - & 2744 & 0 & 0 & 0 & 0 & - & 3400903 & 0 & 0 & 0 & 0 & 45567 & 3952 & 30624260 & 51.03 & 648 & 560 & 18278 & 31052 & 0.83 \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
