\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{2}{|r}|}
\hline
Assembly & SOAPdenovo2.scafSeq & SOAPdenovo2.scafSeq\_broken \\ \hline
\# contigs ($\geq$ 0 bp) & 1244727 & - \\ \hline
\# contigs ($\geq$ 1000 bp) & 42169 & 7435 \\ \hline
\# contigs ($\geq$ 5000 bp) & 11047 & 3 \\ \hline
\# contigs ($\geq$ 10000 bp) & 2422 & 0 \\ \hline
\# contigs ($\geq$ 25000 bp) & 75 & 0 \\ \hline
\# contigs ($\geq$ 50000 bp) & 1 & 0 \\ \hline
Total length ($\geq$ 0 bp) & {\bf 396305066} & - \\ \hline
Total length ($\geq$ 1000 bp) & {\bf 175641192} & 9706221 \\ \hline
Total length ($\geq$ 5000 bp) & {\bf 93023431} & 15626 \\ \hline
Total length ($\geq$ 10000 bp) & {\bf 33916634} & 0 \\ \hline
Total length ($\geq$ 25000 bp) & {\bf 2203480} & 0 \\ \hline
Total length ($\geq$ 50000 bp) & {\bf 59843} & 0 \\ \hline
\# contigs & 81301 & 72973 \\ \hline
Largest contig & {\bf 59843} & 5458 \\ \hline
Total length & {\bf 201754976} & 52389609 \\ \hline
GC (\%) & 51.75 & 51.75 \\ \hline
N50 & {\bf 4715} & 694 \\ \hline
N75 & {\bf 2330} & 579 \\ \hline
L50 & {\bf 12667} & 27790 \\ \hline
L75 & {\bf 25919} & 48552 \\ \hline
\# N's per 100 kbp & 56632.87 & {\bf 2.35} \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
