\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{21}{|r}|}
\hline
Assembly & \# contigs ($\geq$ 0 bp) & \# contigs ($\geq$ 1000 bp) & \# contigs ($\geq$ 5000 bp) & \# contigs ($\geq$ 10000 bp) & \# contigs ($\geq$ 25000 bp) & \# contigs ($\geq$ 50000 bp) & Total length ($\geq$ 0 bp) & Total length ($\geq$ 1000 bp) & Total length ($\geq$ 5000 bp) & Total length ($\geq$ 10000 bp) & Total length ($\geq$ 25000 bp) & Total length ($\geq$ 50000 bp) & \# contigs & Largest contig & Total length & GC (\%) & N50 & N75 & L50 & L75 & \# N's per 100 kbp \\ \hline
simplified\_contigs & 594238 & 63884 & 1854 & 534 & 45 & 0 & 214275465 & 127463012 & 17245673 & 8327951 & 1361443 & 0 & 120583 & 48813 & 169536877 & 54.98 & 1625 & 1003 & 30141 & 63575 & 0.00 \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
