\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{21}{|r}|}
\hline
Assembly & \# contigs ($\geq$ 0 bp) & \# contigs ($\geq$ 1000 bp) & \# contigs ($\geq$ 5000 bp) & \# contigs ($\geq$ 10000 bp) & \# contigs ($\geq$ 25000 bp) & \# contigs ($\geq$ 50000 bp) & Total length ($\geq$ 0 bp) & Total length ($\geq$ 1000 bp) & Total length ($\geq$ 5000 bp) & Total length ($\geq$ 10000 bp) & Total length ($\geq$ 25000 bp) & Total length ($\geq$ 50000 bp) & \# contigs & Largest contig & Total length & GC (\%) & N50 & N75 & L50 & L75 & \# N's per 100 kbp \\ \hline
scaffolds & 157467 & 33261 & 2707 & 912 & 168 & 31 & 122608214 & 84399815 & 30329750 & 18011123 & 7122923 & 2356830 & 72277 & 187873 & 114723812 & 56.01 & 1820 & 971 & 12613 & 34929 & 43.71 \\ \hline
scaffolds\_broken & - & 33463 & 2629 & 855 & 158 & 29 & - & 82524071 & 28933122 & 16746244 & 6650190 & 2179803 & 74771 & 187873 & 114648123 & 56.01 & 1698 & 943 & 13574 & 37028 & 0.00 \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
