\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{2}{|r}|}
\hline
Assembly & SOAPdenovo2-1.scafSeq & SOAPdenovo2-1.scafSeq\_broken \\ \hline
\# contigs ($\geq$ 0 bp) & 482749 & - \\ \hline
\# contigs ($\geq$ 1000 bp) & 58578 & 46216 \\ \hline
\# contigs ($\geq$ 5000 bp) & 12704 & 2717 \\ \hline
\# contigs ($\geq$ 10000 bp) & 3535 & 789 \\ \hline
\# contigs ($\geq$ 25000 bp) & 327 & 80 \\ \hline
\# contigs ($\geq$ 50000 bp) & 39 & 11 \\ \hline
Total length ($\geq$ 0 bp) & {\bf 341262488} & - \\ \hline
Total length ($\geq$ 1000 bp) & {\bf 228456580} & 101401077 \\ \hline
Total length ($\geq$ 5000 bp) & {\bf 119830723} & 26636781 \\ \hline
Total length ($\geq$ 10000 bp) & {\bf 57145040} & 13519626 \\ \hline
Total length ($\geq$ 25000 bp) & {\bf 11730301} & 3021111 \\ \hline
Total length ($\geq$ 50000 bp) & {\bf 2507623} & 745302 \\ \hline
\# contigs & 98478 & 128070 \\ \hline
Largest contig & 110960 & 110960 \\ \hline
Total length & {\bf 255861695} & 157968718 \\ \hline
GC (\%) & 54.82 & 54.98 \\ \hline
N50 & {\bf 4611} & 1364 \\ \hline
N75 & {\bf 2309} & 807 \\ \hline
L50 & {\bf 14391} & 26861 \\ \hline
L75 & {\bf 34701} & 65279 \\ \hline
\# N's per 100 kbp & 29451.44 & {\bf 18.54} \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
