\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{21}{|r}|}
\hline
Assembly & \# contigs ($\geq$ 0 bp) & \# contigs ($\geq$ 1000 bp) & \# contigs ($\geq$ 5000 bp) & \# contigs ($\geq$ 10000 bp) & \# contigs ($\geq$ 25000 bp) & \# contigs ($\geq$ 50000 bp) & Total length ($\geq$ 0 bp) & Total length ($\geq$ 1000 bp) & Total length ($\geq$ 5000 bp) & Total length ($\geq$ 10000 bp) & Total length ($\geq$ 25000 bp) & Total length ($\geq$ 50000 bp) & \# contigs & Largest contig & Total length & GC (\%) & N50 & N75 & L50 & L75 & \# N's per 100 kbp \\ \hline
SOAPdenovo2-1.scafSeq & 482749 & 58578 & 12704 & 3535 & 327 & 39 & 341262488 & 228456580 & 119830723 & 57145040 & 11730301 & 2507623 & 98478 & 110960 & 255861695 & 54.82 & 4611 & 2309 & 14391 & 34701 & 29451.44 \\ \hline
SOAPdenovo2-1.scafSeq\_broken & - & 46216 & 2717 & 789 & 80 & 11 & - & 101401077 & 26636781 & 13519626 & 3021111 & 745302 & 128070 & 110960 & 157968718 & 54.98 & 1364 & 807 & 26861 & 65279 & 18.54 \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
