\HeaderA{changeLog}{Limma Change Log}{changeLog}
\keyword{documentation}{changeLog}
\begin{Description}\relax
Write as text the most recent changes from the limma package changelog.
\end{Description}
\begin{Usage}
\begin{verbatim}
changeLog(n=20)
\end{verbatim}
\end{Usage}
\begin{Arguments}
\begin{ldescription}
\item[\code{n}] integer, number of lines to write of changelog.
\end{ldescription}
\end{Arguments}
\begin{Value}
No value is produced, but a number of lines of text are written to standard output.
\end{Value}
\begin{Author}\relax
Gordon Smyth
\end{Author}
\begin{SeeAlso}\relax
\LinkA{01.Introduction}{01.Introduction}
\end{SeeAlso}

